
rlm@421: %% This defines the bibliography file (main.bib) and the bibliography style.
rlm@421: %% If you want to create a bibliography file by hand, change the contents of
rlm@421: %% this file to a `thebibliography' environment.  For more information 
rlm@421: %% see section 4.3 of the LaTeX manual.
rlm@421: \begin{singlespace}
rlm@421: \bibliography{main}
rlm@421: \bibliographystyle{plain}
rlm@421: \end{singlespace}




